CAPTION='$(lang de:"Zertifikat&amp;Schl&uuml;ssel (lighttpd)" en:"Certificate&amp;Key (lighttpd)")'
DESCRIPTION='$(lang de:"Zertifikat&amp;Key f&uuml;r lighttpd. Dieses Zertifikat und zugerh&ouml;riger privater Schl&uuml;ssel wird nur f&uuml;r den Betrieb mit SSL ben&ouml;tigt.<br>Auf einem Rechner mit openssl kann ein passendes Zertifikat mit Schl&uuml;ssel mit dem Befehl<br> \"openssl req -new -x509 -nodes -out lighttpd.pem -keyout lighttpd.pem\" erstellt werden.<br> Falls ein von einer CA signiertes Zertifikat vorliegt, kopiere bitte den privaten Schl&uuml;ssel im PEM Format und anschliessend das Zertifikat im PEM Format in unten stehende Box." en:"Certificate&amp;Key for lighttpd. This certificate is only needed if run with SSL.<br> On a computer with openssl you can create an according certificate and key with the command <br>\"openssl req -new -x509 -nodes -out lighttpd.pem -keyout lighttpd.pem\"<br>In case a CA-signed certificate is available, please copy the private key in PEM format followed by the certificate in PEM format in the box below.")'
CONFIG_FILE='/tmp/flash/lighttpd/crt.pem'
CONFIG_SAVE='modsave flash; if pidof lighttpd > /dev/null; then echo ""; /mod/etc/init.d/rc.lighttpd restart; fi'
CONFIG_TYPE='text'
