CAPTION='$(lang de:"CA Zertifikat (lighttpd)" en:"CA certificate (lighttpd)")'
DESCRIPTION='$(lang de:"CA Zertifikat f&uuml;r lighttpd. Bitte f&uuml;ge das CA Zertifikat in PEM Format hier ein, falls das lighttpd Zertifikat signiert wurde. Ansonsten lasse diese Box bitte leer." en:"CA certificate for lighttpd. Please add the CA certificate in PEM format if your lighttpd certificate was signed. Otherwise please leave the box empty.")'
CONFIG_FILE='/tmp/flash/lighttpd/ca.pem'
CONFIG_SAVE='modsave flash; if pidof lighttpd > /dev/null; then echo ""; /mod/etc/init.d/rc.lighttpd restart; fi'
CONFIG_TYPE='text'
